X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c5e7a7d769a6ac2b9793591d02fc97c82fb7890a..03cf4aa61da039f4331bfc788cc07850a50a0df5:/docs/latex/wx/wxstring.tex?ds=sidebyside

diff --git a/docs/latex/wx/wxstring.tex b/docs/latex/wx/wxstring.tex
index 57504f03e6..5016c78fbe 100644
--- a/docs/latex/wx/wxstring.tex
+++ b/docs/latex/wx/wxstring.tex
@@ -26,6 +26,10 @@ None
 
 <wx/string.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{Predefined objects}
 
 Objects:
@@ -454,7 +458,7 @@ For ANSI builds only (note the use of {\tt char} instead of {\tt wxChar}).
 The following constructors allow you to construct wxString from a wide string
 in ANSI build or from a C string in Unicode build.
 
-\func{}{wxString}{\param{const wchar\_t*}{ psz}, \param{wxMBConv\&}{ conv}, \param{size\_t}{ nLength = wxSTRING\_MAXLEN}}
+\func{}{wxString}{\param{const wchar\_t*}{ psz}, \param{const wxMBConv\&}{ conv}, \param{size\_t}{ nLength = wxSTRING\_MAXLEN}}
 
 Initializes the string from first \arg{nLength} characters of wide string. 
 The default value of {\tt wxSTRING\_MAXLEN} means take all the string.
@@ -462,7 +466,7 @@ In ANSI build, \arg{conv}'s
 \helpref{WC2MB}{wxmbconvwc2mb} method is called to
 convert \arg{psz} to wide string. It is ignored in Unicode build.
 
-\func{}{wxString}{\param{const char*}{ psz}, \param{wxMBConv\&}{ conv = wxConvLibc}, \param{size\_t}{ nLength = wxSTRING\_MAXLEN}}
+\func{}{wxString}{\param{const char*}{ psz}, \param{const wxMBConv\&}{ conv = wxConvLibc}, \param{size\_t}{ nLength = wxSTRING\_MAXLEN}}
 
 Initializes the string from first \arg{nLength} characters of C string.
 The default value of {\tt wxSTRING\_MAXLEN} means take all the string.
@@ -586,7 +590,7 @@ to a function expecting non-const pointer.
 
 \membersection{wxString::char\_str}\label{wxstringcharstr}
 
-\constfunc{wxWritableCharBuffer}{char\_str}{\param{wxMBConv\&}{ conv = wxConvLibc}}
+\constfunc{wxWritableCharBuffer}{char\_str}{\param{const wxMBConv\&}{ conv = wxConvLibc}}
 
 Returns an object with string data that is implicitly convertible to
 {\tt char*} pointer. Note that any change to the returned buffer is lost and so
@@ -770,7 +774,13 @@ This is a convenience method useful when storing binary data in wxString.
 
 \func{static wxString }{FromAscii}{\param{const char*}{ s}}
 
-\func{static wxString }{FromAscii}{\param{const char}{ c}}
+\func{static wxString }{FromAscii}{\param{const unsigned char*}{ s}}
+
+\func{static wxString }{FromAscii}{\param{const char*}{ s}, \param{size\_t}{ len}}
+
+\func{static wxString }{FromAscii}{\param{const unsigned char*}{ s}, \param{size\_t}{ len}}
+
+\func{static wxString }{FromAscii}{\param{char}{ c}}
 
 Converts the string or character from an ASCII, 7-bit form
 to the native wxString representation. Most useful when using
@@ -980,9 +990,9 @@ Returns \true if the string contents matches a mask containing '*' and '?'.
 
 \membersection{wxString::mb\_str}\label{wxstringmbstr}
 
-\constfunc{const char*}{mb\_str}{\param{wxMBConv\&}{ conv = wxConvLibc}}
+\constfunc{const char*}{mb\_str}{\param{const wxMBConv\&}{ conv = wxConvLibc}}
 
-\constfunc{const wxCharBuffer}{mb\_str}{\param{wxMBConv\&}{ conv = wxConvLibc}}
+\constfunc{const wxCharBuffer}{mb\_str}{\param{const wxMBConv\&}{ conv = wxConvLibc}}
 
 Returns multibyte (C string) representation of the string.
 In Unicode build, converts using \arg{conv}'s \helpref{cWC2MB}{wxmbconvcwc2mb}
@@ -1350,9 +1360,9 @@ UTF-8 build.
 
 \membersection{wxString::wc\_str}\label{wxstringwcstr}
 
-\constfunc{const wchar\_t*}{wc\_str}{\param{wxMBConv\&}{ conv}}
+\constfunc{const wchar\_t*}{wc\_str}{\param{const wxMBConv\&}{ conv}}
 
-\constfunc{const wxWCharBuffer}{wc\_str}{\param{wxMBConv\&}{ conv}}
+\constfunc{const wxWCharBuffer}{wc\_str}{\param{const wxMBConv\&}{ conv}}
 
 Returns wide character representation of the string.
 In ANSI build, converts using \arg{conv}'s \helpref{cMB2WC}{wxmbconvcmb2wc}
@@ -1371,10 +1381,10 @@ The macro wxWX2WCbuf is defined as the correct return type (without const).
 \constfunc{wxWritableWCharBuffer}{wchar\_str}{\void}
 
 Returns an object with string data that is implicitly convertible to
-{\tt char*} pointer. Note that any change to the returned buffer is lost and so
-this function is only usable for passing strings to legacy libraries that
-don't have const-correct API. Use \helpref{wxStringBuffer}{wxstringbuffer} if
-you want to modify the string.
+{\tt char*} pointer. Note that changes to the returned buffer may or may
+not be lost (depending on the build) and so this function is only usable for
+passing strings to legacy libraries that don't have const-correct API. Use
+\helpref{wxStringBuffer}{wxstringbuffer} if you want to modify the string.
 
 \wxheading{See also}
 
