X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c53a2bb3d355541c2491ff0491eb8f19b241a38d..7eb4e9cc0f3590fffda78bf02c47b25c41583eba:/docs/latex/wx/file.tex

diff --git a/docs/latex/wx/file.tex b/docs/latex/wx/file.tex
index 172667c788..8d799e648c 100644
--- a/docs/latex/wx/file.tex
+++ b/docs/latex/wx/file.tex
@@ -114,7 +114,7 @@ values of wxFile::read or wxFile::write really make sense here.
 
 Attaches an existing file descriptor to the wxFile object. Example of predefined
 file descriptors are 0, 1 and 2 which correspond to stdin, stdout and stderr (and
-have symbolic names of wxFile::fd\_stdin, wxFile::fd\_stdout and wxFile::fd\_stderr).
+have symbolic names of {\bf wxFile::fd\_stdin}, {\bf wxFile::fd\_stdout} and {\bf wxFile::fd\_stderr}).
 
 The descriptor should be already opened and it will be closed by wxFile
 object.
@@ -452,7 +452,7 @@ Returns the current position.
 
 \membersection{wxFFile::Write}\label{wxffilewrite}
 
-\func{size_t}{Write}{\param{const void*}{ buffer}, \param{size\_t}{ count}}
+\func{size\_t}{Write}{\param{const void*}{ buffer}, \param{size\_t}{ count}}
 
 Writes the specified number of bytes from a buffer.
 
