X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c5191fbd2b543de54aede153c2c6f8dee29119d1..11ef729d54ee338a1d569b5a238c2feb84d488ff:/docs/latex/wx/mediactrl.tex

diff --git a/docs/latex/wx/mediactrl.tex b/docs/latex/wx/mediactrl.tex
index 843e3d0f6d..155652ae6f 100644
--- a/docs/latex/wx/mediactrl.tex
+++ b/docs/latex/wx/mediactrl.tex
@@ -285,3 +285,4 @@ for the flags parameter, however you can look at the mediactrl header for these.
 The two general flags are wxMEDIACTRLPLAYERCONTROLS\_NONE which turns off the 
 native interface, and wxMEDIACTRLPLAYERCONTROLS\_DEFAULT which lets wxMediaCtrl
 decide what native controls on the interface.
+
