X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c50f1fb9226d9260454ccb9c8a67d0be23c2827f..d2d93fdde48ef1dcbda52bad88fd39b7bd3a5458:/docs/latex/wx/ttips.tex

diff --git a/docs/latex/wx/ttips.tex b/docs/latex/wx/ttips.tex
index e3d74a0ba2..f239b6b984 100644
--- a/docs/latex/wx/ttips.tex
+++ b/docs/latex/wx/ttips.tex
@@ -1,4 +1,4 @@
-\section{Startup tips overview}\label{tipsoverview}
+\section{wxTipProvider overview}\label{tipsoverview}
 
 Many "modern" Windows programs have a feature (some would say annoyance) of
 presenting the user tips at program startup. While this is probably useless to
@@ -40,3 +40,4 @@ probably want to store both the index of the
 last shown tip (as returned by 
 \helpref{wxTipProvider::GetCurrentTip}{wxtipprovidergetcurrenttip} and the flag
 telling whether to show the tips at startup at all.
+
