X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c50f1fb9226d9260454ccb9c8a67d0be23c2827f..cdfb1ae1bcacb8327589a09e6a67f8fc1ef5a82e:/docs/latex/wx/tipprov.tex?ds=sidebyside

diff --git a/docs/latex/wx/tipprov.tex b/docs/latex/wx/tipprov.tex
index dcc3336c5e..c824373aab 100644
--- a/docs/latex/wx/tipprov.tex
+++ b/docs/latex/wx/tipprov.tex
@@ -7,8 +7,7 @@ current tip from it (different tip each time it is called).
 You will never use this class yourself, but you need it to show startup tips
 with wxShowTip. Also, if you want to get the tips text from elsewhere than a
 simple text file, you will want to derive a new class from wxTipProvider and
-use it instead of the one returned by 
-\helpref{wxCreateFileTipProvider}{wxcreatefiletipprovider}.
+use it instead of the one returned by \helpref{wxCreateFileTipProvider}{wxcreatefiletipprovider}.
 
 \wxheading{Derived from}
 
@@ -32,14 +31,14 @@ Constructor.
 
 \docparam{currentTip}{The starting tip index.}
 
-\membersection{wxTipProvider::GetTip}{wxtipprovidergettip}
+\membersection{wxTipProvider::GetTip}\label{wxtipprovidergettip}
 
 \func{wxString}{GetTip}{\void}
 
 Return the text of the current tip and pass to the next one. This function is
 pure virtual, it should be implemented in the derived classes.
 
-\membersection{wxCurrentTipProvider::GetCurrentTip}{wxtipprovidergetcurrenttip}
+\membersection{wxCurrentTipProvider::GetCurrentTip}\label{wxtipprovidergetcurrenttip}
 
 \constfunc{size\_t}{GetCurrentTip}{\void}
 
@@ -50,3 +49,4 @@ The program usually remembers the value returned by this function after calling
 \helpref{wxShowTip}{wxshowtip}. Note that it is not the same as the value which
 was passed to wxShowTip $+ 1$ because the user might have pressed the "Next"
 button in the tip dialog.
+
