X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c3e016e45e2e64b6fbf1eecfdd07448044995b93..0597e7f977c87d107e24bf3e95ebfa3d60efc249:/docs/latex/wx/auinotebook.tex

diff --git a/docs/latex/wx/auinotebook.tex b/docs/latex/wx/auinotebook.tex
index bfa0b37099..b7d3ba5921 100644
--- a/docs/latex/wx/auinotebook.tex
+++ b/docs/latex/wx/auinotebook.tex
@@ -103,7 +103,8 @@ Returns the number of pages in the notebook.
 
 \constfunc{int}{GetPageIndex}{\param{wxWindow* }{page\_wnd}}
 
-Returns the page index for the specified window.  If the window is not found in the notebook, wxNOT_FOUND is returned.
+Returns the page index for the specified window.  If the window is not found in
+the notebook, wxNOT\_FOUND is returned.
 
 \membersection{wxAuiNotebook::GetPageText}\label{wxauinotebookgetpagetext}
 
@@ -175,3 +176,14 @@ instruct the control to use dynamic tab height, which is the default behaviour.
 Under the default behaviour, when a tab with a large bitmap is added, the tab control's
 height will automatically increase to accommodate the larger bitmap.
 
+\func{void}{Split}{\param{size\_t }{page}, \param{int }{direction}}
+
+Split performs a split operation programmatically. The argument \arg{page} indicates
+the page that will be split off.  This page will also become the active page after the
+split.  The \arg{direction} argument specifies where the pane should go, it should be one
+of the following: wxTOP, wxBOTTOM, wxLEFT, or wxRIGHT.
+
+
+
+
+
