X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c3d02b684327b1f1faeec42de2db53a4a2279620..de279b5406eaa3381c197ca3f0b971d0b385cff1:/docs/latex/wx/wxstring.tex

diff --git a/docs/latex/wx/wxstring.tex b/docs/latex/wx/wxstring.tex
index d532d9a5e8..f3296fe1b8 100644
--- a/docs/latex/wx/wxstring.tex
+++ b/docs/latex/wx/wxstring.tex
@@ -540,7 +540,7 @@ Returns the empty string if {\it ch} is not found.
 
 \membersection{wxString::c\_str}\label{wxstringcstr}
 
-\constfunc{const char *}{c\_str}{\void}
+\constfunc{const wxChar *}{c\_str}{\void}
 
 Returns a pointer to the string data ({\tt const char*} in ANSI build,
 {\tt const wchar\_t*} in Unicode build).
@@ -638,7 +638,7 @@ Same as \helpref{Find}{wxstringfind}.
 Returns string representation suitable for passing to OS' functions for
 file handling. In ANSI build, this is same as \helpref{c\_str}{wxstringcstr}.
 In Unicode build, returned value can be either wide character string
-or C string in charset matching the {\tt wxConvFile} object, depending on
+or C string in charset matching the {\tt wxConvFileName} object, depending on
 the OS.
 
 \wxheading{See also}
@@ -659,7 +659,7 @@ This static function returns the string containing the result of calling
 
 \membersection{wxString::FormatV}\label{wxstringformatv}
 
-\func{static wxString}{Format}{\param{const wxChar }{*format}, \param{va\_list }{argptr}}
+\func{static wxString}{FormatV}{\param{const wxChar }{*format}, \param{va\_list }{argptr}}
 
 This static function returns the string containing the result of calling 
 \helpref{PrintfV}{wxstringprintfv} with the passed parameters on it.
@@ -694,7 +694,7 @@ Returns the character at position {\it n} (read-only).
 
 \membersection{wxString::GetData}\label{wxstringgetdata}
 
-\constfunc{const char*}{GetData}{\void}
+\constfunc{const wxChar*}{GetData}{\void}
 
 wxWidgets compatibility conversion. Returns a constant pointer to the data in the string.
 
@@ -1033,7 +1033,7 @@ familiar with C) results.
 
 \constfunc{bool}{ToULong}{\param{unsigned long}{ *val}, \param{int }{base = $10$}}
 
-Attempts to convert the string to a unsigned integer in base {\it base}.
+Attempts to convert the string to an unsigned integer in base {\it base}.
 Returns {\tt true} on success in which case the number is stored in the
 location pointed to by {\it val} or {\tt false} if the string does not
 represent a valid number in the given base.
@@ -1338,7 +1338,7 @@ None
 
 \membersection{wxStringBufferLength::wxStringBufferLength}\label{wxstringbufferlengthctor}
 
-\func{}{wxStringBuffer}{\param{const wxString\& }{str}, \param{size\_t }{len}}
+\func{}{wxStringBufferLength}{\param{const wxString\& }{str}, \param{size\_t }{len}}
 
 Constructs a writable string buffer object associated with the given string
 and containing enough space for at least {\it len} characters. Basically, this
