X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c3627a004d0333ec7bfc88e2a397d7d7f9752ea9..ce756cb06a93facb4faa35a1d57c7038fc26e8e1:/docs/latex/wx/listitem.tex

diff --git a/docs/latex/wx/listitem.tex b/docs/latex/wx/listitem.tex
index fdefb22b54..a2df66652a 100644
--- a/docs/latex/wx/listitem.tex
+++ b/docs/latex/wx/listitem.tex
@@ -124,7 +124,7 @@ Meaningful only for column headers in report mode. Returns the column width.
 \func{void}{SetAlign}{\param{wxListColumnFormat }{align}}
 
 Sets the alignment for the item. See also
-\helpref{wxListItem::SetAlign}{wxlistitemsetalign}
+\helpref{wxListItem::GetAlign}{wxlistitemgetalign}
 
 \membersection{wxListItem::SetBackgroundColour}\label{wxlistitemsetbackgroundcolour}
 
