X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c3627a004d0333ec7bfc88e2a397d7d7f9752ea9..c65650d7b5472d00da0a0516ff1a2ccf53746319:/docs/latex/wx/listctrl.tex

diff --git a/docs/latex/wx/listctrl.tex b/docs/latex/wx/listctrl.tex
index 434c995694..67aa6b07c3 100644
--- a/docs/latex/wx/listctrl.tex
+++ b/docs/latex/wx/listctrl.tex
@@ -673,7 +673,7 @@ The base class version always returns $-1$.
 
 \membersection{wxListCtrl::OnGetItemText}\label{wxlistctrlongetitemtext}
 
-\func{virtual wxString}{OnGetItemText}{\param{long }{item}, \param{long }{column}}
+\constfunc{virtual wxString}{OnGetItemText}{\param{long }{item}, \param{long }{column}}
 
 This function {\bf must} be overloaded in the derived class for a control with 
 {\tt wxLC\_VIRTUAL} style. It should return the string containing the text of
