X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c222be41e7169ab0c60f94ab250170f556339ce5..8b0f8432d72fc44aa7247ab1c19c04103323feea:/docs/latex/wx/window.tex

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index 1087970e5b..1b3c6f172b 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -142,6 +142,9 @@ can delete a window only when it is safe to do so, in idle time.
 Adds a child window.  This is called automatically by window creation
 functions so should not be required by the application programmer.
 
+Notice that this function is mostly internal to wxWindows and shouldn't be
+called by the user code.
+
 \wxheading{Parameters}
 
 \docparam{child}{Child window to add.}
@@ -1932,6 +1935,9 @@ Releases mouse input captured with \helpref{wxWindow::CaptureMouse}{wxwindowcapt
 Removes a child window.  This is called automatically by window deletion
 functions so should not be required by the application programmer.
 
+Notice that this function is mostly internal to wxWindows and shouldn't be
+called by the user code.
+
 \wxheading{Parameters}
 
 \docparam{child}{Child window to remove.}
