X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/c0d26c0f1829cfa09f68e7729a5d9290e5031759..b19d7524fc5787218b54cc28dc23bf319e413b4a:/docs/latex/wx/checkbox.tex

diff --git a/docs/latex/wx/checkbox.tex b/docs/latex/wx/checkbox.tex
index 9026628a39..57147c8184 100644
--- a/docs/latex/wx/checkbox.tex
+++ b/docs/latex/wx/checkbox.tex
@@ -20,7 +20,7 @@ Often this is used as a "Does Not Apply" state.
 
 \twocolwidtha{7cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{\windowstyle{wxCHK\_2STATE}}{Create a 2-state checkbox (This is the default).}
+\twocolitem{\windowstyle{wxCHK\_2STATE}}{Create a 2-state checkbox. This is the default.}
 \twocolitem{\windowstyle{wxCHK\_3STATE}}{Create a 3-state checkbox.}
 \twocolitem{\windowstyle{wxCHK\_ALLOW\_3RD\_STATE\_FOR\_USER}}{By default a user can't set a 3-state checkbox
 to the third state. It can only be done from code. Using this flags allows the user to set the checkbox to the third state by clicking. }
