X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/bf43ff9a903af9e4aa1fdfa72a6d048c0f4367db..6f63704ff4db9da6976547a1378d7e85b966eea7:/docs/latex/wx/frame.tex?ds=sidebyside

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 6eeae2fb8b..c42b8db335 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -512,10 +512,10 @@ menu bar and its menus will be destroyed also, so do not delete the menu
 bar explicitly (except by resetting the frame's menu bar to another
 frame or NULL).
 
-Under Windows, a call to \helpref{wxFrame::OnSize}{wxframeonsize} is generated, so be sure to initialize
+Under Windows, a size event is generated, so be sure to initialize
 data members properly before calling {\bf SetMenuBar}.
 
-Note that it is not possible to call this function twice for the same frame object.
+Note that on some platforms, it is not possible to call this function twice for the same frame object.
 
 \wxheading{See also}
 
