X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/be8098689121d2352751c51005c133797d77ecea..33ff77f695fa78cae844cc930e73c076639b8fe3:/docs/latex/wx/semaphor.tex

diff --git a/docs/latex/wx/semaphor.tex b/docs/latex/wx/semaphor.tex
index 31938286cc..9691e18c0d 100644
--- a/docs/latex/wx/semaphor.tex
+++ b/docs/latex/wx/semaphor.tex
@@ -79,6 +79,6 @@ and then decrement it and return.
 
 \func{bool}{Wait}{\param{unsigned long }{timeout\_millis}}
 
-Same as the version above, but with a timeout limit: returns {\tt TRUE| if the
+Same as the version above, but with a timeout limit: returns {\tt TRUE} if the
 semaphore was acquired and {\tt FALSE} if the timeout has ellapsed
 
