X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/be4bd4636d8e7e06ad5728ff1b398fbd0ab74d93..c663fbea6851207b4e0ac3e362868c23b1494a46:/docs/latex/wx/ipaddr.tex

diff --git a/docs/latex/wx/ipaddr.tex b/docs/latex/wx/ipaddr.tex
index 1e99a048be..08e314c124 100644
--- a/docs/latex/wx/ipaddr.tex
+++ b/docs/latex/wx/ipaddr.tex
@@ -134,7 +134,7 @@ On IPV6 implementations, ::1
 
 Returns true on success, false if something went wrong.
 
-\membersection{wxIPaddress::LocalHost}\label{wxIPaddresslocalhost}
+\membersection{wxIPaddress::IsLocalHost}\label{wxIPaddressislocalhost}
 
 \func{virtual bool}{IsLocalHost}{\void}
 
