X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/be2577e4e650993fe49f18955972e5360840dad2..da27bd0b4ab24d8a3bc504d2d300ab43fa5b8b61:/docs/latex/wx/boxsizer.tex

diff --git a/docs/latex/wx/boxsizer.tex b/docs/latex/wx/boxsizer.tex
index 42a0cf1104..638ceca882 100644
--- a/docs/latex/wx/boxsizer.tex
+++ b/docs/latex/wx/boxsizer.tex
@@ -100,21 +100,21 @@ or wxHORIZONTAL for creating either a column sizer or a row sizer.
 \func{void}{RecalcSizes}{\void}
 
 Implements the calculation of a box sizer's dimensions and then sets
-the size of its its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize}
+the size of its its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize} 
 if the child is a window). It is used internally only and must not be called
-by the users. Documented for information.
+by the user. Documented for information.
 
 \membersection{wxBoxSizer::CalcMin}\label{wxboxsizercalcmin}
 
 \func{wxSize}{CalcMin}{\void}
 
 Implements the calculation of a box sizer's minimal. It is used internally
-only and must not be called by the users. Documented for information.
+only and must not be called by the user. Documented for information.
 
 \membersection{wxBoxSizer::GetOrientation}\label{wxboxsizergetorientation}
 
 \func{int}{GetOrientation}{\void}
 
-Returns the orientation of the boxsizer, either of wxVERTICAL
+Returns the orientation of the box sizer, either wxVERTICAL
 or wxHORIZONTAL.
 
