X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/be03c0ec26612a7ab8a9000f455a015c02e05218..05dedde7d01d55cde7f13f6b6201e24b5b408344:/docs/latex/wx/cmdlpars.tex

diff --git a/docs/latex/wx/cmdlpars.tex b/docs/latex/wx/cmdlpars.tex
index d2a9373fd6..9aa45a8788 100644
--- a/docs/latex/wx/cmdlpars.tex
+++ b/docs/latex/wx/cmdlpars.tex
@@ -178,7 +178,7 @@ combination of \helpref{AddSwitch}{wxcmdlineparseraddswitch},
 
 Using constructors or \helpref{SetDesc}{wxcmdlineparsersetdesc} uses a (usually 
 {\tt const static}) table containing the command line description. If you want
-to decide which options to acccept during the run-time, using one of the 
+to decide which options to accept during the run-time, using one of the 
 {\tt AddXXX()} functions above might be preferable.
 
 \membersection{Customization}\label{wxcmdlineparsercustomization}
