X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/bdcbd8a791ca036d8caacb5f0a2b354a3824f4e1..cc385968c4b81d0cee98c164cb870a8759d927bc:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index 5c565091eb..07242ae6bf 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -308,12 +308,6 @@ Returns the left/right and top/bottom margins, which are also used for inter-too
 Gets the maximum size taken up by the tools after layout, including margins.
 This can be used to size a frame around the toolbar window.
 
-\wxheading{Parameters}
-
-\docparam{w}{Receives the maximum horizontal size.}
-
-\docparam{h}{Receives the maximum vertical size.}
-
 \membersection{wxToolBar::GetToolClientData}\label{wxtoolbargettoolclientdata}
 
 \constfunc{wxObject*}{GetToolClientData}{\param{int }{toolIndex}}
