X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/bc7e0c92ad1e539ac0fed5d5e9b005cf2c2e7121..93c4157c6cf8603eaba7ebbbc3b1e7bd303d8241:/docs/latex/wx/frame.tex?ds=inline

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index daaa50e60e..950fe6da08 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -49,7 +49,7 @@ a wxEVT\_HELP event if the user clicked on an application window. {\it Note} tha
 style and must be set by calling \helpref{SetExtraStyle}{wxwindowsetextrastyle} before Create is called (two-step construction).
 You cannot use this style together with wxMAXIMIZE\_BOX or wxMINIMIZE\_BOX, so
 you should use 
-{\tt wxDEFAULT\_FRAME\_STYLE & ~(wxMINIMIZE\_BOX | wxMAXIMIZE\_BOX)} for the
+{\tt wxDEFAULT\_FRAME\_STYLE \& \~ (wxMINIMIZE\_BOX | wxMAXIMIZE\_BOX)} for the
 frames having this style (the dialogs don't have minimize nor maximize box by
 default)}
 \end{twocollist}
@@ -63,7 +63,7 @@ See also \helpref{window styles overview}{windowstyles}.
 
 \wxheading{Remarks}
 
-An application should normally define an \helpref{OnCloseWindow}{wxwindowonclosewindow} handler for the
+An application should normally define an \helpref{wxCloseEvent}{wxcloseevent} handler for the
 frame to respond to system close events, for example so that related data and subwindows can be cleaned up.
 
 \wxheading{See also}
@@ -400,29 +400,26 @@ implementation returns an instance of \helpref{wxToolBar}{wxtoolbar}.
 
 \helpref{wxFrame::CreateToolBar}{wxframecreatetoolbar}, \helpref{wxToolBar}{wxtoolbar}.
 
-\membersection{wxFrame::OnMenuCommand}\label{wxframeonmenucommand}
-
-\func{void}{OnMenuCommand}{\param{wxCommandEvent\&}{ event}}
-
-See \helpref{wxWindow::OnMenuCommand}{wxwindowonmenucommand}.
-
 \membersection{wxFrame::OnMenuHighlight}\label{wxframeonmenuhighlight}
 
 \func{void}{OnMenuHighlight}{\param{wxMenuEvent\&}{ event}}
 
-See \helpref{wxWindow::OnMenuHighlight}{wxwindowonmenuhighlight}.
+The default implementation displays an appropriate help string
+in the status bar, if there is one.
+
+See \helpref{wxMenuEvent}{wxmenuevent}.
 
 \membersection{wxFrame::OnSize}\label{wxframeonsize}
 
 \func{void}{OnSize}{\param{wxSizeEvent\& }{event}}
 
-See \helpref{wxWindow::OnSize}{wxwindowonsize}.
-
 The default {\bf wxFrame::OnSize} implementation looks for a single subwindow,
 and if one is found, resizes it to fit
 inside the frame. Override this member if more complex behaviour
 is required (for example, if there are several subwindows).
 
+See \helpref{wxSizeEvent}{wxsizeevent}.
+
 \membersection{wxFrame::SetIcon}\label{wxframeseticon}
 
 \func{void}{SetIcon}{\param{const wxIcon\& }{icon}}
@@ -439,6 +436,20 @@ The frame takes a `copy' of {\it icon}, but since it uses reference
 counting, the copy is very quick. It is safe to delete {\it icon} after
 calling this function.
 
+See also \helpref{wxIcon}{wxicon}.
+
+\membersection{wxFrame::SetIcons}\label{wxframeseticons}
+
+\func{void}{SetIcons}{\param{const wxIconBundle\& }{icons}}
+
+Sets the icons for this frame.
+
+\wxheading{Parameters}
+
+\docparam{icons}{The icons to associate with this frame.}
+
+See also \helpref{wxIconBundle}{wxiconbundle}.
+
 % VZ: we don't have all this any more (18.08.00) 
 %
 %Under Windows, instead of using {\bf SetIcon}, you can add the
@@ -466,8 +477,6 @@ calling this function.
 %You can replace std.ico, mdi.ico and child.ico with your own defaults
 %for all your wxWindows application. Currently they show the same icon.
 
-See also \helpref{wxIcon}{wxicon}.
-
 \membersection{wxFrame::SetMenuBar}\label{wxframesetmenubar}
 
 \func{void}{SetMenuBar}{\param{wxMenuBar* }{menuBar}}
