X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/bc55e31bdc7fbf6f1006f298ed8310e7972984e9..3e1512cdfecd2c531567e6603083d9c3968216c7:/docs/latex/wx/htcell.tex

diff --git a/docs/latex/wx/htcell.tex b/docs/latex/wx/htcell.tex
index a627e84ec0..61f802338f 100644
--- a/docs/latex/wx/htcell.tex
+++ b/docs/latex/wx/htcell.tex
@@ -171,6 +171,19 @@ See \helpref{wxHtmlLinkInfo}{wxhtmllinkinfo}.
 These coordinates are used e.g. by COLORMAP. Values are relative to the
 upper left corner of THIS cell (i.e. from 0 to m\_Width or m\_Height)}
 
+\membersection{wxHtmlCell::GetMouseCursor}\label{wxhtmlcellgetmousecursor}
+
+\func{virtual wxCursor}{GetMouseCursor}{\param{wxHtmlWindowInterface* }{window}}
+
+Returns cursor to show when mouse pointer is over the cell.
+
+\wxheading{Parameters}
+
+\docparam{window}{interface to the parent HTML window}
+
+\newsince{2.7.0} (before \tt{GetCursor} method served a similar purpose, which is now deprecated).
+
+
 \membersection{wxHtmlCell::GetNext}\label{wxhtmlcellgetnext}
 
 \constfunc{wxHtmlCell*}{GetNext}{\void}
@@ -249,6 +262,9 @@ you should use wxHtmlBinderCell instead.
 
 \true if a link was clicked, \false otherwise.
 
+\newsince{2.7.0} (before \tt{OnMouseClick} method served a similar purpose).
+
+
 \membersection{wxHtmlCell::SetId}\label{wxhtmlcellsetid}
 
 \func{void}{SetId}{\param{const wxString\& }{id}}
