X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/bc51e42e8b8cdf53ef8e24ab9568236329420778..677b38f28e645e362aedc11758bdda935f71ebfa:/docs/latex/wx/splitpar.tex

diff --git a/docs/latex/wx/splitpar.tex b/docs/latex/wx/splitpar.tex
index f82a9f0a27..af5a93ae96 100644
--- a/docs/latex/wx/splitpar.tex
+++ b/docs/latex/wx/splitpar.tex
@@ -24,25 +24,24 @@ only examined but not modified.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxEvent::widthSash}
+\membersection{wxEvent::widthSash}\label{wxeventwidthsash}
 
 \member{const wxCoord}{widthSash}
 
 The width of the splitter sash.
 
 
-\membersection{wxSplitterRenderParams::border}
+\membersection{wxSplitterRenderParams::border}\label{wxsplitterrenderparamsborder}
 
 \member{const wxCoord}{border}
 
 The width of the border drawn by the splitter inside it, may be $0$.
 
 
-\membersection{wxSplitterRenderParams::isHotSensitive}
+\membersection{wxSplitterRenderParams::isHotSensitive}\label{wxsplitterrenderparamsishotsensitive}
 
 \member{const bool}{isHotSensitive}
 
 \true if the sash changes appearance when the mouse passes over it, \false
 otherwise.
 
-
