X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/bc509e346e5475c0cd5570c7c5ece0e2c7e9d14e..239ef314528b253ea4ca5946ec2cfcb74bab1866:/docs/latex/wx/dialog.tex?ds=sidebyside

diff --git a/docs/latex/wx/dialog.tex b/docs/latex/wx/dialog.tex
index f66b0cca22..9181cc2060 100644
--- a/docs/latex/wx/dialog.tex
+++ b/docs/latex/wx/dialog.tex
@@ -326,7 +326,7 @@ The default handler for the wxID\_APPLY identifier.
 
 \wxheading{Remarks}
 
-This function calls \helpref{wxWindow::Validate}{wxwindowvalidate} and \helpref{wxWindow::TransferDataToWindow}{wxwindowtransferdatafromwindow}.
+This function calls \helpref{wxWindow::Validate}{wxwindowvalidate} and \helpref{wxWindow::TransferDataFromWindow}{wxwindowtransferdatafromwindow}.
 
 \wxheading{See also}
 
