X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ba637f22e61113ab2296936f9a101e929cc05711..878ddad57a352a5609fd7bfd63406ed5f2aac564:/docs/latex/wx/datistrm.tex

diff --git a/docs/latex/wx/datistrm.tex b/docs/latex/wx/datistrm.tex
index 6c1ec4e1f7..ae95da775e 100644
--- a/docs/latex/wx/datistrm.tex
+++ b/docs/latex/wx/datistrm.tex
@@ -39,14 +39,14 @@ None
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxDataInputStream::wxDataInputStream}\label{wxdatainputstreamconstr}
+\membersection{wxDataInputStream::wxDataInputStream}\label{wxdatainputstreamctor}
 
 \func{}{wxDataInputStream}{\param{wxInputStream\&}{ stream}}
 
 \func{}{wxDataInputStream}{\param{wxInputStream\&}{ stream}, \param{wxMBConv\&}{ conv = wxMBConvUTF8}}
 
 Constructs a datastream object from an input stream. Only read methods will
-be available. The second form is only available in Unicode build of wxWindows.
+be available. The second form is only available in Unicode build of wxWidgets.
 
 \wxheading{Parameters}
 
@@ -57,45 +57,76 @@ mode (see \helpref{wxDataInputStream::ReadString}{wxdatainputstreamreadstring}
 documentation for detailed description). Note that you must not destroy
 {\it conv} before you destroy this wxDataInputStream instance!}
 
-\membersection{wxDataInputStream::\destruct{wxDataInputStream}}
+\membersection{wxDataInputStream::\destruct{wxDataInputStream}}\label{wxdatainputstreamdtor}
 
 \func{}{\destruct{wxDataInputStream}}{\void}
 
 Destroys the wxDataInputStream object.
 
-\membersection{wxDataInputStream::BigEndianOrdered}
+\membersection{wxDataInputStream::BigEndianOrdered}\label{wxdatainputstreambigendianordered}
 
 \func{void}{BigEndianOrdered}{\param{bool}{ be\_order}}
 
-If {\it be\_order} is TRUE, all data will be read in big-endian
+If {\it be\_order} is true, all data will be read in big-endian
 order, such as written by programs on a big endian architecture 
 (e.g. Sparc) or written by Java-Streams (which always use 
 big-endian order).
   
-\membersection{wxDataInputStream::Read8}
+\membersection{wxDataInputStream::Read8}\label{wxdatainputstreamread8}
 
 \func{wxUint8}{Read8}{\void}
 
 Reads a single byte from the stream.
 
-\membersection{wxDataInputStream::Read16}
+\func{void}{Read8}{\param{wxUint8 *}{buffer}, \param{size\_t }{size}}
+
+Reads bytes from the stream in a specified buffer. The amount of
+bytes to read is specified by the {\it size} variable.
+
+\membersection{wxDataInputStream::Read16}\label{wxdatainputstreamread16}
 
 \func{wxUint16}{Read16}{\void}
 
-Reads a 16 bit integer from the stream.
+Reads a 16 bit unsigned integer from the stream.
+
+\func{void}{Read16}{\param{wxUint16 *}{buffer}, \param{size\_t }{size}}
+
+Reads 16 bit unsigned integers from the stream in a specified buffer. the
+amount of 16 bit unsigned integer to read is specified by the {\it size} variable.
 
-\membersection{wxDataInputStream::Read32}
+\membersection{wxDataInputStream::Read32}\label{wxdatainputstreamread32}
 
 \func{wxUint32}{Read32}{\void}
 
-Reads a 32 bit integer from the stream.
+Reads a 32 bit unsigned integer from the stream.
+
+\func{void}{Read32}{\param{wxUint32 *}{buffer}, \param{size\_t }{size}}
+
+Reads 32 bit unsigned integers from the stream in a specified buffer. the amount of
+32 bit unsigned integer to read is specified by the {\it size} variable.
+
+\membersection{wxDataInputStream::Read64}\label{wxdatainputstreamread32}
 
-\membersection{wxDataInputStream::ReadDouble}
+\func{wxUint64}{Read64}{\void}
+
+Reads a 64 bit unsigned integer from the stream.
+
+\func{void}{Read64}{\param{wxUint64 *}{buffer}, \param{size\_t }{size}}
+
+Reads 64 bit unsigned integers from the stream in a specified buffer. the amount of
+64 bit unsigned integer to read is specified by the {\it size} variable.
+
+\membersection{wxDataInputStream::ReadDouble}\label{wxdatainputstreamreaddouble}
 
 \func{double}{ReadDouble}{\void}
 
 Reads a double (IEEE encoded) from the stream.
 
+\func{void}{ReadDouble}{\param{double *}{buffer}, \param{size\_t }{size}}
+
+Reads double data (IEEE encoded) from the stream in a specified buffer. the amount of
+double to read is specified by the {\it size} variable.
+
 \membersection{wxDataInputStream::ReadString}\label{wxdatainputstreamreadstring}
 
 \func{wxString}{ReadString}{\void}
@@ -104,7 +135,7 @@ Reads a string from a stream. Actually, this function first reads a long
 integer specifying the length of the string (without the last null character) 
 and then reads the string.
 
-In Unicode build of wxWindows, the fuction first reads multibyte (char*)
+In Unicode build of wxWidgets, the fuction first reads multibyte (char*)
 string from the stream and then converts it to Unicode using the {\it conv}
 object passed to constructor and returns the result as wxString. You are
 responsible for using the same convertor as when writing the stream.
