X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ba637f22e61113ab2296936f9a101e929cc05711..801a492c49f0e4641046b4fbb3f2d18111b1b387:/docs/latex/wx/datistrm.tex?ds=inline

diff --git a/docs/latex/wx/datistrm.tex b/docs/latex/wx/datistrm.tex
index 6c1ec4e1f7..2bff0f65e6 100644
--- a/docs/latex/wx/datistrm.tex
+++ b/docs/latex/wx/datistrm.tex
@@ -82,13 +82,19 @@ Reads a single byte from the stream.
 
 \func{wxUint16}{Read16}{\void}
 
-Reads a 16 bit integer from the stream.
+Reads a 16 bit unsigned integer from the stream.
 
 \membersection{wxDataInputStream::Read32}
 
 \func{wxUint32}{Read32}{\void}
 
-Reads a 32 bit integer from the stream.
+Reads a 32 bit unsigned integer from the stream.
+
+\membersection{wxDataInputStream::Read64}
+
+\func{wxUint64}{Read64}{\void}
+
+Reads a 64 bit unsigned integer from the stream.
 
 \membersection{wxDataInputStream::ReadDouble}
 
