X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/ba637f22e61113ab2296936f9a101e929cc05711..44cf9b50eef370cc94a6c1f249693dee3776d619:/docs/latex/wx/datistrm.tex

diff --git a/docs/latex/wx/datistrm.tex b/docs/latex/wx/datistrm.tex
index 6c1ec4e1f7..158ffffb2e 100644
--- a/docs/latex/wx/datistrm.tex
+++ b/docs/latex/wx/datistrm.tex
@@ -67,7 +67,7 @@ Destroys the wxDataInputStream object.
 
 \func{void}{BigEndianOrdered}{\param{bool}{ be\_order}}
 
-If {\it be\_order} is TRUE, all data will be read in big-endian
+If {\it be\_order} is true, all data will be read in big-endian
 order, such as written by programs on a big endian architecture 
 (e.g. Sparc) or written by Java-Streams (which always use 
 big-endian order).
@@ -82,13 +82,19 @@ Reads a single byte from the stream.
 
 \func{wxUint16}{Read16}{\void}
 
-Reads a 16 bit integer from the stream.
+Reads a 16 bit unsigned integer from the stream.
 
 \membersection{wxDataInputStream::Read32}
 
 \func{wxUint32}{Read32}{\void}
 
-Reads a 32 bit integer from the stream.
+Reads a 32 bit unsigned integer from the stream.
+
+\membersection{wxDataInputStream::Read64}
+
+\func{wxUint64}{Read64}{\void}
+
+Reads a 64 bit unsigned integer from the stream.
 
 \membersection{wxDataInputStream::ReadDouble}
 
