X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b9e34846ec348313f8c83273155b178092dd1eab..bc8e3eadaf1d794cb05e4f88bc8dc206d4d43bc4:/docs/latex/wx/cppconst.tex

diff --git a/docs/latex/wx/cppconst.tex b/docs/latex/wx/cppconst.tex
index 36c2885acc..f35465960a 100644
--- a/docs/latex/wx/cppconst.tex
+++ b/docs/latex/wx/cppconst.tex
@@ -164,5 +164,12 @@ defined as $0$, only wxBase is available.}
 \twocolitem{wxUSE\_BASE}{only used by wxWidgets internally (defined as $1$ when
 building wxBase code, either as a standalone library or as part of the
 monolithic wxWidgets library, defined as $0$ when building GUI library only)}
+\twocolitem{wxNO\_RTTI}{is defined if the compiler RTTI support has been switched off}
+\twocolitem{wxNO\_EXCEPTIONS}{is defined if the compiler support for C++
+exceptions has been switched off}
+\twocolitem{wxNO\_THREADS}{if this macro is defined, the compilation options
+don't include compiler flags needed for multithreaded code generation. This
+implies that wxUSE\_THREADS is $0$ and also that other (non wx-based) threading
+packages cannot be used neither.}
 \end{twocollist}
 
