X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b88d16d3ad1efb6ffedeb7107a6688af14bab81e..8060b0be0e5b8cc8b033158b8cfb241efeb82876:/docs/latex/wx/auinotebook.tex

diff --git a/docs/latex/wx/auinotebook.tex b/docs/latex/wx/auinotebook.tex
index fadedc161c..b7d3ba5921 100644
--- a/docs/latex/wx/auinotebook.tex
+++ b/docs/latex/wx/auinotebook.tex
@@ -87,6 +87,12 @@ Returns the associated art provider.
 
 Returns the page specified by the given index.
 
+\membersection{wxAuiNotebook::GetPageBitmap}\label{wxauinotebookgetpagebitmap}
+
+\constfunc{wxBitmap}{GetPageBitmap}{\param{size\_t }{page}}
+
+Returns the tab bitmap for the page.
+
 \membersection{wxAuiNotebook::GetPageCount}\label{wxauinotebookgetpagecount}
 
 \constfunc{size\_t}{GetPageCount}{\void}
@@ -97,7 +103,14 @@ Returns the number of pages in the notebook.
 
 \constfunc{int}{GetPageIndex}{\param{wxWindow* }{page\_wnd}}
 
-Returns the page index for the specified window.  If the window is not found in the notebook, wxNOT_FOUND is returned.
+Returns the page index for the specified window.  If the window is not found in
+the notebook, wxNOT\_FOUND is returned.
+
+\membersection{wxAuiNotebook::GetPageText}\label{wxauinotebookgetpagetext}
+
+\constfunc{wxString}{GetPageText}{\param{size\_t }{page}}
+
+Returns the tab label for the page.
 
 \membersection{wxAuiNotebook::GetSelection}\label{wxauinotebookgetselection}
 
@@ -162,3 +175,15 @@ if some tabs don't have bitmaps.  Passing wxDefaultSize to this function will
 instruct the control to use dynamic tab height, which is the default behaviour.
 Under the default behaviour, when a tab with a large bitmap is added, the tab control's
 height will automatically increase to accommodate the larger bitmap.
+
+\func{void}{Split}{\param{size\_t }{page}, \param{int }{direction}}
+
+Split performs a split operation programmatically. The argument \arg{page} indicates
+the page that will be split off.  This page will also become the active page after the
+split.  The \arg{direction} argument specifies where the pane should go, it should be one
+of the following: wxTOP, wxBOTTOM, wxLEFT, or wxRIGHT.
+
+
+
+
+
