X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b853ebf6f50f279f043569719b236fc7024c2aaf..df10208f26d2659e5995fd00debeb4eaa11174cc:/docs/latex/wx/valtext.tex?ds=sidebyside

diff --git a/docs/latex/wx/valtext.tex b/docs/latex/wx/valtext.tex
index 872c58826e..18deafa423 100644
--- a/docs/latex/wx/valtext.tex
+++ b/docs/latex/wx/valtext.tex
@@ -21,7 +21,7 @@ For more information, please see \helpref{Validator overview}{validatoroverview}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxTextValidator::wxTextValidator}\label{wxtextvalidatorconstr}
+\membersection{wxTextValidator::wxTextValidator}\label{wxtextvalidatorctor}
 
 \func{}{wxTextValidator}{\param{const wxTextValidator\&}{ validator}}
 
@@ -62,7 +62,7 @@ should have a lifetime equal to or longer than the validator lifetime (which is
 determined by the lifetime of the window). % If NULL, the validator uses its own internal storage for the value. NOT true
 }
 
-\membersection{wxTextValidator::\destruct{wxTextValidator}}
+\membersection{wxTextValidator::\destruct{wxTextValidator}}\label{wxtextvalidatordtor}
 
 \func{}{\destruct{wxTextValidator}}{\void}
 
