X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b82827dd43caa489eade15cc02edef7fb79e8c20..d5db80c26999bab5ad0ee610aeaa59ffb0e9c1c6:/docs/latex/wx/critsect.tex

diff --git a/docs/latex/wx/critsect.tex b/docs/latex/wx/critsect.tex
index 2bc984a077..0851745cd8 100644
--- a/docs/latex/wx/critsect.tex
+++ b/docs/latex/wx/critsect.tex
@@ -1,6 +1,6 @@
 \section{\class{wxCriticalSection}}\label{wxcriticalsection}
 
-A critical section object is used exactly for the same purpose as 
+A critical section object is used for the same exactly purpose as 
 \helpref{mutexes}{wxMutex}. The only difference is that under Windows platform
 critical sections are only visible inside one process, while mutexes may be
 shared between processes, so using critical sections is slightly more
@@ -18,6 +18,10 @@ possible instead of directly using wxCriticalSection for the same reasons
 
 None.
 
+\wxheading{Include files}
+
+<wx/thread.h>
+
 \wxheading{See also}
 
 \helpref{wxThread}{wxthread}, \helpref{wxCondition}{wxcondition}, 
