X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b82827dd43caa489eade15cc02edef7fb79e8c20..0c5d3e1ccd1d27ab0cf913ddbffb1b54b5802f3a:/docs/latex/wx/crtslock.tex

diff --git a/docs/latex/wx/crtslock.tex b/docs/latex/wx/crtslock.tex
index b4212b2577..a9515b8137 100644
--- a/docs/latex/wx/crtslock.tex
+++ b/docs/latex/wx/crtslock.tex
@@ -10,6 +10,10 @@ and difficult to debug problems).
 
 None.
 
+\wxheading{Include files}
+
+<wx/thread.h>
+
 \wxheading{See also}
 
 \helpref{wxCriticalSection}{wxcriticalsection}, 
