X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b7ea712cc26f4289211f4a24e308f40ff6445991..8cc1b7b526c21655907e0a0485daf3611a699ca8:/docs/latex/wx/glcontext.tex

diff --git a/docs/latex/wx/glcontext.tex b/docs/latex/wx/glcontext.tex
index 692288e9ac..057977aad2 100644
--- a/docs/latex/wx/glcontext.tex
+++ b/docs/latex/wx/glcontext.tex
@@ -15,6 +15,10 @@ was initialized. (This applies to sharing display lists among contexts analogous
 
 Note that some wxGLContext features are extremely platform-specific - its best to check your native platform's glcanvas header (on windows include/wx/msw/glcanvas.h) to see what features your native platform provides.
 
+\wxheading{Library}
+
+\helpref{wxGl}{librarieslist}
+
 \wxheading{Derived from}
 
 \helpref{wxObject}{wxobject}
@@ -47,9 +51,10 @@ with equivalent attributes as {\it win}.}
 
 \membersection{wxGLContext::SetCurrent}\label{wxglcontextsetcurrent}
 
-\func{void}{SetCurrent}{\param{const wxGLCanvas&}{ win}}
+\func{void}{SetCurrent}{\param{const wxGLCanvas\&}{ win}}
 
 Makes the OpenGL state that is represented by this rendering context current with the wxGLCanvas {\it win}.
 Note that {\it win} can be a different wxGLCanvas window than the one that was passed to the constructor of this rendering context.
-If { \it RC } is an object of type wxGLContext, the statements { \it RC.SetCurrent(win); } and { \it win.SetCurrent(RC); } are equivalent,
-see \helpref{wxGLCanvas::SetCurrent}{wxglcanvassetcurrent_rc}.
+If { \it RC } is an object of type wxGLContext, the statements {\it RC.SetCurrent(win);} and {\it win.SetCurrent(RC);} are equivalent,
+see \helpref{wxGLCanvas::SetCurrent}{wxglcanvassetcurrent}.
+
