X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b7d216951f5488dfe15ca33c098c39d37bf81813..78cb09ec439962b53ba75fef814b9a3871412287:/docs/latex/wx/stackframe.tex

diff --git a/docs/latex/wx/stackframe.tex b/docs/latex/wx/stackframe.tex
index 2218e776fb..5472a6fddb 100644
--- a/docs/latex/wx/stackframe.tex
+++ b/docs/latex/wx/stackframe.tex
@@ -5,7 +5,7 @@
 %% Created:     2005-01-19
 %% RCS-ID:      $Id$
 %% Copyright:   (c) 2005 Vadim Zeitlin
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxStackFrame}}\label{wxstackframe}
@@ -25,6 +25,10 @@ No base class
 
 <wx/stackwalk.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 Only available if \texttt{wxUSE\_STACKWALKER} is $1$, currently only
 implemented for Win32 and Unix versions using recent version of GNU libc.
 
