X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b7cacb43db1e69b87b257a67912b4d52995b070a..5814e8ba4e57839acd1eb7491ed392b07e382593:/docs/latex/wx/socket.tex

diff --git a/docs/latex/wx/socket.tex b/docs/latex/wx/socket.tex
index de3c5c5a88..ac48755b04 100644
--- a/docs/latex/wx/socket.tex
+++ b/docs/latex/wx/socket.tex
@@ -524,6 +524,8 @@ The following flags can be used:
 \twocolitem{{\bf wxSOCKET\_WAITALL}}{Wait for all required data to be read/written unless an error occurs.}
 \twocolitem{{\bf wxSOCKET\_BLOCK}}{Block the GUI (do not yield) while reading/writing data.}
 \twocolitem{{\bf wxSOCKET\_REUSEADDR}}{Allows the use of an in-use port (wxServerSocket only)}
+\twocolitem{{\bf wxSOCKET\_BROADCAST}}{Switches the socket to broadcast mode}
+\twocolitem{{\bf wxSOCKET\_NOBIND}}{Stops the socket from being bound to a specific adapter (normally used in conjunction with {\bf wxSOCKET\_BROADCAST})}
 \end{twocollist}
 
 A brief overview on how to use these flags follows.
@@ -568,6 +570,10 @@ your platform's implementation of setsockopt(). Note that on BSD-based systems (
 use of wxSOCKET\_REUSEADDR implies SO\_REUSEPORT in addition to SO\_REUSEADDR to be consistent
 with Windows.
 
+The {\bf wxSOCKET\_BROADCAST} flag controls the use of the SO\_BROADCAST standard
+setsockopt() flag. This flag allows the socket to use the broadcast address, and is generally
+used in conjunction with {\bf wxSOCKET\_NOBIND} and \helpref{wxIPaddress::BroadcastAddress}{wxipaddressbroadcastaddress}.
+
 So:
 
 {\bf wxSOCKET\_NONE} will try to read at least SOME data, no matter how much.
