X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b75b6d4cd79a8aad9cf187c8d1b4760dd3ceee58..6b2878de13d4159bbb399c862b00762a94f07be7:/docs/latex/wx/wxmgl.tex

diff --git a/docs/latex/wx/wxmgl.tex b/docs/latex/wx/wxmgl.tex
index 11f651d303..0d71fa8ccd 100644
--- a/docs/latex/wx/wxmgl.tex
+++ b/docs/latex/wx/wxmgl.tex
@@ -6,15 +6,21 @@ its widgets using the wxUniversal widget set which is now
 part of wxWindows. MGL itself runs on a variety of platforms
 including DOS, Linux hardware (similar to the Linux framebuffer)
 and various graphics systems such as Win32, X11 and OS/2.
+Note that currently MGL for Linux runs only on x86-based systems.
 
 You will need wxWindows 2.3.3 or higher and MGL 5.0 or higher.
 The latter is available from
 
-  http://www.scitechsoft.com/products/product_download.html
-  
-In order to configure wxWindows to compile wxMGL you will 
-need to type
+\urlref{http://www.scitechsoft.com/products/product\_download.html}{http://www.scitechsoft.com/products/product\_download.html}
 
+In order to configure wxWindows to compile wxMGL you will
+need to type:
+
+\begin{verbatim}
   configure --with-mgl --with-universal
-  
-under DOS, wxMGL uses a dmake based make system.
\ No newline at end of file
+\end{verbatim}
+
+Under DOS, wxMGL uses a dmake based make system.
+
+For further information, please see the files in docs/mgl
+in the distribution.
