X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b67a86d57493137cb1f7cce8ca8daf0b7120207e..d67c33888f65e236adedd65ffbd978607eadc9d5:/docs/latex/wx/view.tex

diff --git a/docs/latex/wx/view.tex b/docs/latex/wx/view.tex
index f364dc1322..d2f90a297c 100644
--- a/docs/latex/wx/view.tex
+++ b/docs/latex/wx/view.tex
@@ -25,6 +25,10 @@ and \helpref{wxDocManager}{wxdocmanager} classes.
 
 <wx/docview.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxView overview}{wxviewoverview}, \helpref{wxDocument}{wxdocument}, \helpref{wxDocTemplate}{wxdoctemplate},\rtfsp
@@ -141,7 +145,7 @@ frame associated with the view.
 
 \membersection{wxView::OnClosingDocument}\label{wxviewonclosingdocument}
 
-\func{virtual void}{OnClosingDoocument}{\void}
+\func{virtual void}{OnClosingDocument}{\void}
 
 Override this to clean up the view when the document is being
 closed.
