X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b67a86d57493137cb1f7cce8ca8daf0b7120207e..c36cdfc084f779b67668af8cad3eb6906182af21:/docs/latex/wx/tlw.tex?ds=sidebyside

diff --git a/docs/latex/wx/tlw.tex b/docs/latex/wx/tlw.tex
index ca5897497b..c40594c21c 100644
--- a/docs/latex/wx/tlw.tex
+++ b/docs/latex/wx/tlw.tex
@@ -26,6 +26,10 @@ applicable for the two classes above.
 
 <wx/toplevel.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -40,6 +44,18 @@ Returns \true if the platform supports making the window translucent.
 \helpref{wxTopLevelWindow::SetTransparent}{wxtoplevelwindowsettransparent}
 
 
+\membersection{wxTopLevelWindow::EnableCloseButton}\label{wxtoplevelenableclosebutton}
+
+\func{bool}{EnableCloseButton}{\param{bool}{ enable = true}}
+
+Enables or disables the Close button (most often in the right
+upper corner of a dialog) and the Close entry of the system
+menu (most often in the left upper corner of the dialog).
+Currently only implemented for wxMSW and wxGTK. Returns
+true if operation was successful. This may be wrong on
+X11 (including GTK+) where the window manager may not support
+this operation and there is no way to find out.
+
 \membersection{wxTopLevelWindow::GetDefaultItem}\label{wxtoplevelwindowgetdefaultitem}
 
 \constfunc{wxWindow *}{GetDefaultItem}{\void}
@@ -268,6 +284,43 @@ Unavailable on full keyboard machines.
 \helpref{wxTopLevelWindow::SetRightMenu}{wxtoplevelwindowsetrightmenu}.
 
 
+\membersection{wxTopLevelWindow::SetMaxSize}\label{wxtoplevelwindowsetmaxsize}
+
+\func{void}{SetMaxSize}{\param{const wxSize\& }{size}}
+
+A simpler interface for setting the size hints than
+\helpref{SetSizeHints}{wxtoplevelwindowsetsizehints}.
+
+\membersection{wxTopLevelWindow::SetMinSize}\label{wxtoplevelwindowsetminsize}
+
+\func{void}{SetMinSize}{\param{const wxSize\& }{size}}
+
+A simpler interface for setting the size hints than
+\helpref{SetSizeHints}{wxtoplevelwindowsetsizehints}.
+
+\membersection{wxTopLevelWindow::SetSizeHints}\label{wxtoplevelwindowsetsizehints}
+
+\func{virtual void}{SetSizeHints}{\param{int}{ minW}, \param{int}{ minH}, \param{int}{ maxW=-1}, \param{int}{ maxH=-1},
+ \param{int}{ incW=-1}, \param{int}{ incH=-1}}
+
+\func{void}{SetSizeHints}{\param{const wxSize\&}{ minSize},
+\param{const wxSize\&}{ maxSize=wxDefaultSize}, \param{const wxSize\&}{ incSize=wxDefaultSize}}
+
+Allows specification of minimum and maximum window sizes, and window size increments.
+If a pair of values is not set (or set to -1), the default values will be used.
+
+\docparam{incW}{Specifies the increment for sizing the width (GTK/Motif/Xt only).}
+
+\docparam{incH}{Specifies the increment for sizing the height (GTK/Motif/Xt only).}
+
+\docparam{incSize}{Increment size (GTK/Motif/Xt only).}
+
+\wxheading{Remarks}
+
+If this function is called, the user will not be able to size the window outside
+the given bounds. The resizing increments are only significant under GTK, Motif or Xt.
+
+
 \membersection{wxTopLevelWindow::SetRightMenu}\label{wxtoplevelwindowsetrightmenu}
 
 \func{void}{SetRightMenu}{\param{int}{ id = wxID\_ANY}, \param{const wxString\&}{ label = wxEmptyString}, \param{wxMenu *}{ subMenu = NULL}}
