X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b67a86d57493137cb1f7cce8ca8daf0b7120207e..ab9717339232a7a728dea666c59b73fd6ac78dd3:/docs/latex/wx/gauge.tex

diff --git a/docs/latex/wx/gauge.tex b/docs/latex/wx/gauge.tex
index 04126ed292..ddef4738db 100644
--- a/docs/latex/wx/gauge.tex
+++ b/docs/latex/wx/gauge.tex
@@ -27,6 +27,10 @@ There are no user commands for the gauge.
 
 <wx/gauge.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -202,8 +206,11 @@ This method is not implemented (doesn't do anything) for most platforms.
 
 \func{void}{SetValue}{\param{int }{pos}}
 
-Sets the position of the gauge.
-This function makes the gauge switch to determinate mode, if it's not already.
+Sets the position of the gauge. The \arg{pos} must be between $0$ and the gauge
+range as returned by \helpref{GetRange}{wxgaugegetrange}, inclusive.
+
+This function makes the gauge switch to determinate mode, if it was in
+indeterminate mode before.
 
 \wxheading{Parameters}
 
