X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b67a86d57493137cb1f7cce8ca8daf0b7120207e..a236aa2058ccf3d36e9cafc20fa7375080c4be50:/docs/latex/wx/progdlg.tex

diff --git a/docs/latex/wx/progdlg.tex b/docs/latex/wx/progdlg.tex
index 10d71cc00f..1c98623d11 100644
--- a/docs/latex/wx/progdlg.tex
+++ b/docs/latex/wx/progdlg.tex
@@ -112,9 +112,9 @@ empty (which is the default) the message is not changed.}
 \helpref{Update}{wxprogressdialogupdate} call, this is set to true.}
 
 
-\membersection{wxProgressDialog::UpdatePulse}\label{wxprogressdialogupdatepulse}
+\membersection{wxProgressDialog::Pulse}\label{wxprogressdialogpdatepulse}
 
-\func{virtual bool}{UpdatePulse}{\param{const wxString\& }{newmsg = ""},\rtfsp
+\func{virtual bool}{Pulse}{\param{const wxString\& }{newmsg = ""},\rtfsp
 \param{bool *}{skip = NULL}}
 
 Just like \helpref{Update}{wxprogressdialogupdate} but makes
