X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b67a86d57493137cb1f7cce8ca8daf0b7120207e..5f167b77d20f656f9e855113175849bd2e79cc58:/docs/latex/wx/view.tex

diff --git a/docs/latex/wx/view.tex b/docs/latex/wx/view.tex
index f364dc1322..993aa9f9ca 100644
--- a/docs/latex/wx/view.tex
+++ b/docs/latex/wx/view.tex
@@ -141,7 +141,7 @@ frame associated with the view.
 
 \membersection{wxView::OnClosingDocument}\label{wxviewonclosingdocument}
 
-\func{virtual void}{OnClosingDoocument}{\void}
+\func{virtual void}{OnClosingDocument}{\void}
 
 Override this to clean up the view when the document is being
 closed.
