X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b67a86d57493137cb1f7cce8ca8daf0b7120207e..242019eef3fdcdb12b5310da67af3ef6d15e0f58:/docs/latex/wx/progdlg.tex

diff --git a/docs/latex/wx/progdlg.tex b/docs/latex/wx/progdlg.tex
index 10d71cc00f..2798c7be8a 100644
--- a/docs/latex/wx/progdlg.tex
+++ b/docs/latex/wx/progdlg.tex
@@ -19,6 +19,7 @@ the elapsed, remaining and estimated time for the end of the progress.
 \wxheading{Derived from}
 
 \helpref{wxDialog}{wxdialog}\\
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
@@ -112,9 +113,9 @@ empty (which is the default) the message is not changed.}
 \helpref{Update}{wxprogressdialogupdate} call, this is set to true.}
 
 
-\membersection{wxProgressDialog::UpdatePulse}\label{wxprogressdialogupdatepulse}
+\membersection{wxProgressDialog::Pulse}\label{wxprogressdialogpdatepulse}
 
-\func{virtual bool}{UpdatePulse}{\param{const wxString\& }{newmsg = ""},\rtfsp
+\func{virtual bool}{Pulse}{\param{const wxString\& }{newmsg = ""},\rtfsp
 \param{bool *}{skip = NULL}}
 
 Just like \helpref{Update}{wxprogressdialogupdate} but makes
