X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b64de91622281ec29d4e5990d09aa6ca6c41e0a0..83a16cfa8c82898eac3a38f547ce48839adda2de:/docs/latex/wx/postscpt.tex

diff --git a/docs/latex/wx/postscpt.tex b/docs/latex/wx/postscpt.tex
index 541f3158c0..c901a61772 100644
--- a/docs/latex/wx/postscpt.tex
+++ b/docs/latex/wx/postscpt.tex
@@ -27,7 +27,7 @@ Constructor. {\it output} is an optional file for printing to, and if
 various parameters. {\it parent} is the parent of the printer dialog box.
 
 Use the {\it Ok} member to test whether the constructor was successful
-in creating a useable device context.
+in creating a usable device context.
 
 See \helpref{Printer settings}{printersettings} for functions to set and
 get PostScript printing settings.
@@ -49,3 +49,4 @@ output. Default is 720ppi.
 
 Return resolution used in PostScript output. See 
 \helpref{SetResolution}{wxpostscriptdcsetresolution}.
+
