X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b5a4a47df5ad0d52cac80946bdd0685d34749fc4..43c9c17dfbc351e9b754aa6380db12d292c2e115:/docs/latex/wx/image.tex?ds=sidebyside

diff --git a/docs/latex/wx/image.tex b/docs/latex/wx/image.tex
index 07e43de3ce..1366f12d04 100644
--- a/docs/latex/wx/image.tex
+++ b/docs/latex/wx/image.tex
@@ -259,6 +259,13 @@ Gets the green value of the mask colour.
 
 Gets the red value of the mask colour.
 
+\membersection{wxImage::GetSubImage}\label{wximagegetsubimage}
+
+\constfunc{wxImage}{GetSubImage}{\param{const wxRect&}{rect}}
+
+Returns a sub image of the current one as long as the rect belongs entirely to 
+the image.
+
 \membersection{wxImage::GetWidth}\label{wximagegetwidth}
 
 \constfunc{int}{GetWidth}{\void}
@@ -310,8 +317,7 @@ of a given handler class in an application session.}
 \func{bool}{LoadFile}{\param{const wxString\&}{ name}, \param{const wxString\&}{ mimetype}}
 
 Loads an image from a file. If no handler type is provided, the library will
-try to use wxBITMAP\_TYPE\_BMP or all known handlers previously installed
-through a call to \helpref{wxImage::InitAllHandlers}{wximageinitallhandlers}.
+try to use wxBITMAP\_TYPE\_BMP.
 
 \func{bool}{LoadFile}{\param{wxInputStream\&}{ stream}, \param{long}{ type}}
 
@@ -459,8 +465,8 @@ Returns a scaled version of the image. This is also useful for
 scaling bitmaps in general as the only other way to scale bitmaps
 is to blit a wxMemoryDC into another wxMemoryDC.
 
-NB: although Windows can do such scaling itself but in the GTK port, scaling
-bitmaps is done using this routine internally.
+It may be mentioned that the GTK post uses this function internally
+to scale bitmaps when using mapping mode in wxDC. 
 
 Example:
 
@@ -485,13 +491,6 @@ Example:
 
 \helpref{Rescale}{wximagerescale}
 
-\membersection{wxImage::GetSubImage}\label{wximagegetsubimage}
-
-\constfunc{wxImage}{GetSubImage}{\param{const wxRect&}{rect}}
-
-Returns a sub image of the current one as long as the rect belongs entirely to 
-the image.
-
 \membersection{wxImage::SetData}\label{wximagesetdata}
 
 \func{void}{SetData}{\param{unsigned char*}{data}}
