X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b58206c46732c3c6fe769406dc926020791038c9..54753153a66a78a67a8129ff37982ad3abe5c291:/docs/latex/wx/graphicspen.tex

diff --git a/docs/latex/wx/graphicspen.tex b/docs/latex/wx/graphicspen.tex
old mode 100755
new mode 100644
index 39ea0f9438..14b741dc34
--- a/docs/latex/wx/graphicspen.tex
+++ b/docs/latex/wx/graphicspen.tex
@@ -13,7 +13,8 @@
 
 \wxheading{Derived from}
 
-\helpref{wxGraphicsObject}{wxgraphicsobject}
+\helpref{wxGraphicsObject}{wxgraphicsobject}\\
+\helpref{wxObject}{wxobject}
 
 A wxGraphicsPen is a native representation of a pen. It is used for stroking a path on a graphics context. The contents are specific and private to the respective renderer. Instances are ref counted and can therefore be assigned as usual. The only way to get a valid instance is via a CreatePen call on the graphics context or the renderer instance.
 
@@ -21,3 +22,7 @@ A wxGraphicsPen is a native representation of a pen. It is used for stroking a p
 
 <wx/graphics.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
