X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b52401b28745ff0e05e89d2fdddc5fe9596ccfa7..17bcb99892b5b424cc6888b1eecd34f5c37a16b4:/docs/latex/wx/vlbox.tex

diff --git a/docs/latex/wx/vlbox.tex b/docs/latex/wx/vlbox.tex
index 6e3b7c8a2a..d89098dd5c 100644
--- a/docs/latex/wx/vlbox.tex
+++ b/docs/latex/wx/vlbox.tex
@@ -129,7 +129,7 @@ Get the number of items in the control.
 \constfunc{wxPoint}{GetMargins}{\void}
 
 Returns the margins used by the control. The {\tt x} field of the returned
-point is the horizontal margine and the {\tt y} field is the vertical one.
+point is the horizontal margin and the {\tt y} field is the vertical one.
 
 \wxheading{See also}
 
@@ -317,6 +317,7 @@ This method is only valid for multi selection listboxes.
 
 \helpref{SelectAll}{wxvlistboxselectall}, \helpref{Select}{wxvlistboxselect}
 
+\membersection{wxVListBox::SetItemCount}\label{wxvlistboxsetitemcount}
 
 \func{void}{SetItemCount}{\param{size\_t }{count}}
 
