X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b4a980f4f57a4e7eea00c55cbb3d139f97d90c20..6d0f32ddb8e1aec3b8707db31ed244758c242672:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index 33d6266ef4..967416a24c 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -24,6 +24,10 @@ No base class.
 
 <wx/dynlib.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 (only available if \texttt{wxUSE\_DYNLIB\_CLASS} is set to $1$)
 
 \latexignore{\rtfignore{\wxheading{Members}}}
@@ -163,6 +167,8 @@ be a combination of the following bits:
 \twocolitem{wxDL\_VERBATIM}{don't try to append the appropriate extension to
 the library name (this is done by default).}
 \twocolitem{wxDL\_DEFAULT}{default flags, same as wxDL\_NOW currently}
+\twocolitem{wxDL\_QUIET}{don't log an error message if the library couldn't be
+loaded.}
 \end{twocollist}
 
 Returns \true if the library was successfully loaded, \false otherwise.
@@ -200,6 +206,10 @@ No base class.
 
 <wx/dynlib.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 (only available if \texttt{wxUSE\_DYNLIB\_CLASS} is set to $1$)
 
 \latexignore{\rtfignore{\wxheading{Members}}}
