X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b48f51ca745c5d3dfd704947812bbea90a44a1eb..aad035b2f51cc206edc0b888695dfb5c8d53687a:/docs/latex/wx/tlw.tex

diff --git a/docs/latex/wx/tlw.tex b/docs/latex/wx/tlw.tex
index 2949193ae8..ca5897497b 100644
--- a/docs/latex/wx/tlw.tex
+++ b/docs/latex/wx/tlw.tex
@@ -152,7 +152,7 @@ Returns \true if the window is iconized.
 Returns \true if the window is maximized.
 
 
-\membersection{wxTopLevelWindow::IsUsingNativeDecorations}{wxtoplevelwindowisusingnativedecorations}
+\membersection{wxTopLevelWindow::IsUsingNativeDecorations}\label{wxtoplevelwindowisusingnativedecorations}
 
 \constfunc{bool}{IsUsingNativeDecorations}{\void}
 
@@ -412,3 +412,4 @@ for some reason.
 \wxheading{See also}
 
 \helpref{UseNativeDecorations}{wxtoplevelwindowusenativedecorations}
+
