X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b453e1b24bfa07074b29f1599a731c0c58d731b0..22d6efa851642c6a69174278fc50f712f41e2271:/docs/latex/wx/clipbrd.tex?ds=inline

diff --git a/docs/latex/wx/clipbrd.tex b/docs/latex/wx/clipbrd.tex
index 151509e42d..e9b3352026 100644
--- a/docs/latex/wx/clipbrd.tex
+++ b/docs/latex/wx/clipbrd.tex
@@ -114,12 +114,12 @@ Call this function to set the data object to the clipboard. This function will
 clear all previous contents in the clipboard, so calling it several times
 does not make any sense.
 
-\membersection{wxClipboard::UsePrimarySelection}\label{wxclipboaruseprimary}
+\membersection{wxClipboard::UsePrimarySelection}\label{wxclipboarduseprimary}
 
-\func{void}{UsePrimarySelection}{\param(bool}{ primary = TRUE}
+\func{void}{UsePrimarySelection}{\param{bool}{ primary = TRUE}}
 
 On platforms supporting it (currently only GTK), selects the so called
 PRIMARY SELECTION as the clipboard as opposed to the normal clipboard,
-if primary is TRUE.
+if {\it primary} is TRUE.
 
 
