X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b3e51e0f0fea8747bfe4b2a9f9e0d184e4b0db38..751731864888f00e31e6dce1092ac28a1fac5358:/docs/latex/wx/semaphor.tex

diff --git a/docs/latex/wx/semaphor.tex b/docs/latex/wx/semaphor.tex
index 88190caa8b..dfd0796a1d 100644
--- a/docs/latex/wx/semaphor.tex
+++ b/docs/latex/wx/semaphor.tex
@@ -6,7 +6,7 @@
 %% Created:     02.04.02
 %% RCS-ID:      $Id$
 %% Copyright:   (c) 2002 Vadim Zeitlin
-%% License:     wxWindows license
+%% License:     wxWidgets license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxSemaphore}}\label{wxsemaphore}
@@ -60,7 +60,7 @@ Destructor is not virtual, don't use this class polymorphically.
 \func{wxSemaError }{Post}{\void}
 
 Increments the semaphore count and signals one of the waiting
-threads in an atomic way. Returns wxSEMA_OVERFLOW if the count
+threads in an atomic way. Returns wxSEMA\_OVERFLOW if the count
 would increase the counter past the maximum.
 
 \wxheading{Return value}
