X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b3e51e0f0fea8747bfe4b2a9f9e0d184e4b0db38..12ac619f42b81420980aec14afc9433af6f911dc:/docs/latex/wx/semaphor.tex?ds=inline

diff --git a/docs/latex/wx/semaphor.tex b/docs/latex/wx/semaphor.tex
index 88190caa8b..68da8177ec 100644
--- a/docs/latex/wx/semaphor.tex
+++ b/docs/latex/wx/semaphor.tex
@@ -60,7 +60,7 @@ Destructor is not virtual, don't use this class polymorphically.
 \func{wxSemaError }{Post}{\void}
 
 Increments the semaphore count and signals one of the waiting
-threads in an atomic way. Returns wxSEMA_OVERFLOW if the count
+threads in an atomic way. Returns wxSEMA\_OVERFLOW if the count
 would increase the counter past the maximum.
 
 \wxheading{Return value}
