X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b3daa5a32277ef8f31390f7a178ea14735b3f069..e3dbf5934e997729c6f4f5154b1b7f29d5d22149:/docs/latex/wx/frame.tex?ds=sidebyside

diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 0bc42220db..950fe6da08 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -24,7 +24,7 @@ application windows.
 
 \twocolwidtha{5cm}
 \begin{twocollist}\itemsep=0pt
-\twocolitem{\windowstyle{wxDEFAULT\_FRAME\_STYLE}}{Defined as {\bf wxMINIMIZE\_BOX \pipe wxMAXIMIZE\_BOX \pipe wxRESIZE\_BOX \pipe wxSYSTEM\_MENU \pipe wxCAPTION}.}
+\twocolitem{\windowstyle{wxDEFAULT\_FRAME\_STYLE}}{Defined as {\bf wxMINIMIZE\_BOX \pipe wxMAXIMIZE\_BOX \pipe wxRESIZE\_BORDER \pipe wxSYSTEM\_MENU \pipe wxCAPTION}.}
 \twocolitem{\windowstyle{wxICONIZE}}{Display the frame iconized (minimized). Windows only. }
 \twocolitem{\windowstyle{wxCAPTION}}{Puts a caption on the frame.}
 \twocolitem{\windowstyle{wxMINIMIZE}}{Identical to {\bf wxICONIZE}. Windows only.}
@@ -47,7 +47,11 @@ wxFRAME\_TOOL\_WINDOW or wxFRAME\_NO\_TASKBAR instead}
 caption. When pressed, Windows will go into a context-sensitive help mode and wxWindows will send
 a wxEVT\_HELP event if the user clicked on an application window. {\it Note} that this is an extended
 style and must be set by calling \helpref{SetExtraStyle}{wxwindowsetextrastyle} before Create is called (two-step construction).
-You cannot use this style together with wxMAXIMIZE\_BOX or wxMINIMIZE\_BOX.}
+You cannot use this style together with wxMAXIMIZE\_BOX or wxMINIMIZE\_BOX, so
+you should use 
+{\tt wxDEFAULT\_FRAME\_STYLE \& \~ (wxMINIMIZE\_BOX | wxMAXIMIZE\_BOX)} for the
+frames having this style (the dialogs don't have minimize nor maximize box by
+default)}
 \end{twocollist}
 
 The default frame style is for normal, resizeable frames. To create a frame
@@ -59,7 +63,7 @@ See also \helpref{window styles overview}{windowstyles}.
 
 \wxheading{Remarks}
 
-An application should normally define an \helpref{OnCloseWindow}{wxwindowonclosewindow} handler for the
+An application should normally define an \helpref{wxCloseEvent}{wxcloseevent} handler for the
 frame to respond to system close events, for example so that related data and subwindows can be cleaned up.
 
 \wxheading{See also}
@@ -276,7 +280,7 @@ Returns a pointer to the toolbar currently associated with the frame (if any).
 
 \func{void}{Iconize}{\param{bool}{ iconize}}
 
-Iconizes or restores the frame. Windows only.
+Iconizes or restores the frame.
 
 \wxheading{Parameters}
 
@@ -286,11 +290,21 @@ Iconizes or restores the frame. Windows only.
 
 \helpref{wxFrame::IsIconized}{wxframeisiconized}, \helpref{wxFrame::Maximize}{wxframemaximize}.
 
+\membersection{wxFrame::IsFullScreen}\label{wxframeisfullscreen}
+
+\func{bool}{IsFullScreen}{\void}
+
+Returns TRUE if the frame is in fullscreen mode.
+
+\wxheading{See also}
+
+\helpref{wxFrame::ShowFullScreen}{wxframeshowfullscreen}
+
 \membersection{wxFrame::IsIconized}\label{wxframeisiconized}
 
 \constfunc{bool}{IsIconized}{\void}
 
-Returns TRUE if the frame is iconized. Windows only.
+Returns TRUE if the frame is iconized.
 
 \membersection{wxFrame::IsMaximized}\label{wxframeismaximized}
 
@@ -386,29 +400,26 @@ implementation returns an instance of \helpref{wxToolBar}{wxtoolbar}.
 
 \helpref{wxFrame::CreateToolBar}{wxframecreatetoolbar}, \helpref{wxToolBar}{wxtoolbar}.
 
-\membersection{wxFrame::OnMenuCommand}\label{wxframeonmenucommand}
-
-\func{void}{OnMenuCommand}{\param{wxCommandEvent\&}{ event}}
-
-See \helpref{wxWindow::OnMenuCommand}{wxwindowonmenucommand}.
-
 \membersection{wxFrame::OnMenuHighlight}\label{wxframeonmenuhighlight}
 
 \func{void}{OnMenuHighlight}{\param{wxMenuEvent\&}{ event}}
 
-See \helpref{wxWindow::OnMenuHighlight}{wxwindowonmenuhighlight}.
+The default implementation displays an appropriate help string
+in the status bar, if there is one.
+
+See \helpref{wxMenuEvent}{wxmenuevent}.
 
 \membersection{wxFrame::OnSize}\label{wxframeonsize}
 
 \func{void}{OnSize}{\param{wxSizeEvent\& }{event}}
 
-See \helpref{wxWindow::OnSize}{wxwindowonsize}.
-
 The default {\bf wxFrame::OnSize} implementation looks for a single subwindow,
 and if one is found, resizes it to fit
 inside the frame. Override this member if more complex behaviour
 is required (for example, if there are several subwindows).
 
+See \helpref{wxSizeEvent}{wxsizeevent}.
+
 \membersection{wxFrame::SetIcon}\label{wxframeseticon}
 
 \func{void}{SetIcon}{\param{const wxIcon\& }{icon}}
@@ -425,6 +436,20 @@ The frame takes a `copy' of {\it icon}, but since it uses reference
 counting, the copy is very quick. It is safe to delete {\it icon} after
 calling this function.
 
+See also \helpref{wxIcon}{wxicon}.
+
+\membersection{wxFrame::SetIcons}\label{wxframeseticons}
+
+\func{void}{SetIcons}{\param{const wxIconBundle\& }{icons}}
+
+Sets the icons for this frame.
+
+\wxheading{Parameters}
+
+\docparam{icons}{The icons to associate with this frame.}
+
+See also \helpref{wxIconBundle}{wxiconbundle}.
+
 % VZ: we don't have all this any more (18.08.00) 
 %
 %Under Windows, instead of using {\bf SetIcon}, you can add the
@@ -452,8 +477,6 @@ calling this function.
 %You can replace std.ico, mdi.ico and child.ico with your own defaults
 %for all your wxWindows application. Currently they show the same icon.
 
-See also \helpref{wxIcon}{wxicon}.
-
 \membersection{wxFrame::SetMenuBar}\label{wxframesetmenubar}
 
 \func{void}{SetMenuBar}{\param{wxMenuBar* }{menuBar}}
@@ -535,6 +558,8 @@ variable fields.
 \pythonnote{Only a single parameter is required, a Python list of
 integers.}
 
+\perlnote{In wxPerl this method takes the field widths as parameters.}
+
 \membersection{wxFrame::SetToolBar}\label{wxframesettoolbar}
 
 \func{void}{SetToolBar}{\param{wxToolBar*}{ toolBar}}
@@ -577,5 +602,9 @@ indicate what elements of the frame to hide in full-screen mode:
 \item wxFULLSCREEN\_ALL (all of the above)
 \end{itemize}
 
-This function only works on Windows and has not been tested with MDI frames.
+This function has not been tested with MDI frames.
+
+\wxheading{See also}
+
+\helpref{wxFrame::IsFullScreen}{wxframeisfullscreen}
 
