X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/b32c6ff0624aca1857e5184c4cda675037efaf00..cd9da200285e3c625be91768c9ca61dc218c94d0:/docs/latex/wx/scrolwin.tex

diff --git a/docs/latex/wx/scrolwin.tex b/docs/latex/wx/scrolwin.tex
index ef24da24c9..8224091442 100644
--- a/docs/latex/wx/scrolwin.tex
+++ b/docs/latex/wx/scrolwin.tex
@@ -301,7 +301,8 @@ that direction).
 
 \func{void}{SetScrollbars}{\param{int}{ pixelsPerUnitX}, \param{int}{ pixelsPerUnitY},\rtfsp
 \param{int}{ noUnitsX}, \param{int}{ noUnitsY},\rtfsp
-\param{int }{xPos = 0}, \param{int}{ yPos = 0}}
+\param{int }{xPos = 0}, \param{int}{ yPos = 0},\rtfsp
+\param{bool }{noRefresh = FALSE}}
 
 Sets up vertical and/or horizontal scrollbars.
 
@@ -319,6 +320,8 @@ Sets up vertical and/or horizontal scrollbars.
 
 \docparam{yPos}{Position to initialize the scrollbars in the vertical direction, in scroll units.}
 
+\docparam{noRefresh}{Will not refresh window if TRUE.}
+
 \wxheading{Remarks}
 
 The first pair of parameters give the number of pixels per `scroll step', i.e. amount
@@ -351,9 +354,9 @@ adjusting the scrollbars appropriately.
 Call this function to tell wxScrolledWindow to perform the actually scrolling on
 a different window (not on itself).
 
-\membersection{wxScrolledWindow::ViewStart}\label{wxscrolledwindowviewstart}
+\membersection{wxScrolledWindow::GetViewStart}\label{wxscrolledwindowgetviewstart}
 
-\constfunc{void}{ViewStart}{\param{int* }{x}, \param{int* }{ y}}
+\constfunc{void}{GetViewStart}{\param{int* }{x}, \param{int* }{ y}}
 
 Get the position at which the visible portion of the window starts.
 
